-120 -80 -40 0 40 80 120 160 200 240 280 320 360 400 0

0.005

0.01

0.015

0.02

0.025

% change

Density

Winter

-120 -80 -40 0 40 80 120 160 200 240 280 320 360 400 0

0.005

0.01

0.015

0.02

0.025

% change

Spring

-120 -80 -40 0 40 80 120 160 200 240 280 320 360 400 0

0.005

0.01

0.015

0.02

0.025

% change

Summer

-120 -80 -40 0 40 80 120 160 200 240 280 320 360 400 0

0.005

0.01

0.015

0.02

0.025

% change

Autumn

-120 -80 -40 0 40 80 120 160 200 240 280 320 360 400 0

0.005

0.01

0.015

0.02

0.025

% change

Annual

Beograd A2 scenario (2071-2100)

Probability density of getting a certain % change in mean rainfall

Red curve: un-weighted ensemble mean, Black curve: weighted ensemble mean