1 6 11 16 21 26 31 36 41 46 0 10 20 30 40 freq

Consecutive hours of precip

Hemsby (2050s) Medium Low

Wet Hour Persistence - January

1 6 11 16 21 26 31 36 41 46 0

10

20

30

Consecutive hours of precip

Wet Hour Persistence - July

0.1-0.5 0.5-1.0 1-2 2-5 5-10 10-25 25-50 50-100 0 20 40 60 80

Class (precip mm)

Frequency of wet hour amounts - January

0.1-0.5 0.5-1.0 1-2 2-5 5-10 10-25 25-50 50-100 0 20 40 60 80

Class (precip mm)

Frequency of wet hour amounts - July