0 2 4 6 8 10 Sunshine hours

0

5

10

15 Wind speed ms-1

0 5 10 15 20 25 Vapour pressure hPa

Heathrow (2080s) Perturbed - Low

J F M A M J J A S O N D 0 2 4 6 8 10 Reference potential evapotranspiration mm day -1

Half Months