0

0.5

1 Proportion of dry days

0 2 4 6 Mean wet day precipitation mm day -1

0 5 10 15 Interannual variability of half monthly precipitation totals

0 10 20 Minimum temperature oC

Bradford (2080s) Perturbed - Medium Low

J F M A M J J A S O N D 0 10 20 30 Maximum temperature

Half Months